Melting curve

We estimate a typical error of ß 600 K in our melting temperatures.

aJ. M. Brown, & J. McQueen, Geophys. Res. 91, 7485 (1986)._b

G. Shen et al., Geophys. Res. Lett. 25, 373 (1998); these data represent a lower bound for the melting curve.

cBass et al., p. 393, AGU Washington, D. C., 1987 dR. Boehler, Nature 363, 534-536 (1993). eQ. Williams et. al, Science 286, 181-182 (1987).

Melting curve

We estimate a typical error of ß 600 K in our melting temperatures.

aJ. M. Brown, & J. McQueen, Geophys. Res. 91, 7485 (1986)._b

G. Shen et al., Geophys. Res. Lett. 25, 373 (1998); these data represent a lower bound for the melting curve.

cBass et al., p. 393, AGU Washington, D. C., 1987 dR. Boehler, Nature 363, 534-536 (1993). eQ. Williams et. al, Science 286, 181-182 (1987).